Iprocessi

Unprocesso e‘una struttura dati rappresentante un flusso dicalcolo

morgana% ps -aux
USER PID %CPU %MEM SIZE RSS TTY STAT START TIME COMMAND
root 1 0.0 0.7 868 240 ? S 07:56 0:03 init auto
root 2 0.0 0.0 0 0 ? SW 07:56 0:00 (kflushd)
root 3 0.0 0.0 0 0 ? SW< 07:56 0:00 (kswapd)
root 30 0.0 0.7 868 220 ? S 07:56 0:00 /usr/sbin/crond -l10
root 73 0.0 1.4 1072 460 ? S 07:56 0:00 sendmail: accepting c
root 95 0.0 1.0 868 312 3 S 07:56 0:00 /sbin/agetty 38400 tt
root 291 11.6 11.6 5840 3568 ? S 08:35 2:49 X :0
root 312 0.0 3.5 2168 1080 2 S 08:35 0:00 xterm -bw 2 -geometry
root 313 0.0 3.1 2088 976 2 S 08:35 0:00 xterm -bw 4 -geometry
root 366 0.0 3.4 2160 1072 2 S 08:52 0:00 xterm -n sandra -T sa
rubini 94 0.0 2.4 1036 752 2 S 07:56 0:00 /bin/login -- rubini
rubini 148 0.0 2.8 1368 876 2 S 07:58 0:01 -tcsh
rubini 290 0.0 1.0 1372 308 2 S 08:35 0:00 xinit /home/staff/rub
rubini 293 0.0 1.7 1192 544 2 S 08:35 0:00 sh /home/staff/rubini
rubini 300 0.3 3.4 1988 1052 2 S 08:35 0:05 vtwm
rubini 302 0.0 1.6 1556 520 2 S N 08:35 0:00 xdaliclock -24 -fn -a
rubini 303 0.2 4.1 2312 1264 2 S N 08:35 0:04 xman -geometry -5+5
rubini 368 0.0 1.2 884 384 p3 S 08:52 0:00 rlogin sandra
rubini 371 0.0 1.3 928 416 p1 R 08:59 0:00 ps -aux

Ilprocesso "init"viene fattopartireautomaticamente tuttoilresto dipende dalla configurazionedel sistema

/etc/inittab /etc/rc.d

Ilcomando "ps"riportala situazione attuale del sistema

IdispositiviconvenzionalidiI/Osono predispostiper l’usotramitestdin e stdout

morgana% sort data | a2ps | bold | \
                rsh prozio "cat > /dev/lp0"
[Total: 3 pages on 2 sheets]