10k 1000pF

June 1998 Alessandro Rubini Version 1.0

OUT+ to amplifier or small spkr

50kHz

OUT-

Standalone Audio (8bit, 8kHz)

470pF 47k 1k

10k

1/2 LM6142

LTC1069-1

low pass 6 5 7 5 8 4 10k 5V 1.5Vp-p

10k D0 D1 D2 D3 D4 D5 D6 D7

100k 20k

7x10k 2%

8x10k 2% 2 3 4 5 6 7 8 9

2 3 1 5V 10k 1%

10k 1%

2x10k 1%

IRQ 10

470pF 1% 120k 1%

1/2 LM6142

8kHz

1/4 74HC00 1/4 74HC00